arXiv:1207.7183v1 [hep-ex] 31 Jul 2012

Measurement of zero degree inclusive photon energy spectra for √ s = 900 GeV proton-proton collisions at LHC O. Adriani^{a,b}, L. Bonechi^a, M. Bongi^a, G. Castellini^a, R. D’Alessandro^{a,b}, K. Fukatsu^c, M. Haguenauer^e, T. Iso^c, Y. Itow^{c,d,∗}, K. Kasahara^f, K. Kawade^c, T. Mase^c, K. Masuda^c, H. Menjo^{a,d}, G. Mitsuka^c, Y. Muraki^c, K. Noda^i, P. Papini^a, A.-L. Perrot^g, S. Ricciarini^a, T. Sako^{c,d}, K. Suzuki^c, T. Suzuki^f, K. Taki^c, T. Tamura^h, S. Torii^f, A. Tricomi^{i,j}, W. C. Turner^k

aINFN Section of Florence, Italy bUniversity of Florence, Italy cSolar-Terrestrial Environment Laboratory, Nagoya University, Nagoya, Japan dKobayashi-Maskawa Institute for the Origin of Particles and the Universe, Nagoya University, Nagoya, Japan eEcole-Polytechnique, Palaiseau, France fRISE, Waseda University, Japan gCERN, Switzerland hKanagawa University, Japan iINFN Section of Catania, Italy jUniversity of Catania, Italy kLBNL, Berkeley, California, USA

Abstract

The inclusive photon energy spectra measured by the Large Hadron Collider forward (LHCf) experiment in the very forward region of LHC protonproton collisions at √ s = 900 GeV are reported. The results from the analysis of 0.30 nb^{−1} of data collected in May 2010 in the two pseudorapidity regions of η > 10.15 and 8.77 < η < 9.46 are compared with the predictions of the hadronic interaction models DPMJET 3.04, EPOS 1.99, PYTHIA 8.145, QGSJET II-03 and SIBYLL 2.1, which are widely used in ultra-high-energy cosmic-ray experiments. EPOS 1.99 and SYBILL 2.1 show a reasonable agreement with the spectral shape of the experimental data, whereas they predict lower cross-sections than the data. The other models, DPMJET 3.04,

∗itow@stelab.nagoya-u.ac.jp

Preprint submitted to Physics Letters B February 4, 2013

QGSJET II-03 and PYTHIA 8.145, are in good agreement with the data below 300 GeV but predict harder energy spectra than the data above 300 GeV. The results of these comparisons exhibited features similar to those for the previously reported data for √ s = 7 TeV collisions.

Keywords:

LHC, Ultra-High Energy Cosmic Ray, hadronic interaction models

1. Introduction

The observations of ultra-high-energy cosmic rays (UHECR) have made notable improvements in the last few years [1] [2] [3] [4] [5] [6] [7]. However, although some critical parts of the interpretation rely on the Monte Carlo (MC) simulations of the air shower development, very forward particle emission in the hadronic interactions, which are relevant to the precise understanding of air showers, have been poorly understood thus far, especially at such high energies. To reduce the uncertainty in MC air shower simulations, the Large Hadron Collider forward (LHCf) experiment has performed measurements of the neutral particles emitted to the very forward region of proton-proton collisions at the LHC. In 2010, the operations at √ s = 7 TeV and 900 GeV were completed. The photon energy spectra obtained from the 7 TeV data have been previously reported elsewhere [8]. Below this energy, the measurement of the P_T spectra of π^0s by UA7 in the rapidity region Y = 5.05 – 6.65 [9] is available. It is interesting to have a single-photon measurement at 0 degrees at different collision energies in order to discuss energy dependence. In this paper, we report the inclusive photon energy spectra in the very forward region for √ s = 900 GeV proton-proton collisions with the same detectors and analysis methods as those used for the √ s = 7 TeV analysis.

Two LHCf detectors, called Arm1 and Arm2, were installed in the instrumentation slots of the TANs (Target Neutral Absorbers) located at ±140 m from the ATLAS interaction point (IP1) and covering the pseudorapidity range from 8.7 to infinity (zero degrees). Each detector had two sampling and imaging calorimeters composed of 44 radiation lengths (1.55 hadron interaction lengths) of tungsten and 16 sampling layers of 3 mm thick plastic scintillators. The transverse sizes of the calorimeters were 20 mm × 20 mm and 40 mm × 40 mm in Arm1 and 25 mm × 25 mm and 32 mm × 32 mm in Arm2. The smaller and larger calorimeter of each Arm are called the small tower and large tower, respectively. The cross sections of the calorimeters, as observed from IP1, are illustrated in Fig. 1. During the operations that were used in the analysis reported in this paper, a large fraction of the large Arm1 tower was obscured from the IP as indicated by the shaded area in the Fig. 1 due to the beam pipe material between the IP and the detector.

Four X-Y layers of position-sensitive detectors (scintillating fiber, SciFi, belts in Arm1 and silicon micro-strip sensors in Arm2 with 1-mm and 0.16- mm readout pitches, respectively) were inserted to measure the transverse positions of the showers. The LHCf detectors have energy and position resolutions better than 5 % and 200 μm, respectively, for >100 GeV photons. Detailed descriptions of the detectors can be found elsewhere [10] [11] [12] [13] [14] [15].

This paper describes the first results of the analysis of inclusive photon energy spectra for √ s = 900 GeV proton-proton collisions, which are primarily produced from the decay of π^0 and η mesons generated in the collisions. The data set and the MC simulation used in the analysis are introduced in Sec. 2 and Sec. 3, respectively. The analysis process is described in Sec. 4. The experimental results and comparison with the MC predictions of several hadronic interaction models are presented in Sec. 5 and summarized in Sec. 6.

2. Data

The data sets used in the analysis were taken on 2, 3 and 27 May 2010 during the LHC operations with proton-proton collisions at √ s = 900 GeV, which correspond to the LHC fill identification numbers (Fill ID) 1068, 1069 and 1128, respectively. In these fills, the LHC operated with one crossing bunch and one non-crossing bunch at IP1 in Fill IDs 1068 and 1069 and with four crossing bunches and three non-crossing bunches at IP1 in Fill ID 1128. The luminosity (L) at IP1 during these fills was measured by the ATLAS experiment [16]. The luminosity during Fill ID 1068 and 1069 were 8 – 3 × 10^{27} cm^{−2}s^{−1} and 12 – 4 × 10^{27} cm^{−2}s^{−1}, respectively. The total luminosity of the four crossing bunches in Fill ID 1128 was approximately 8 × 10^{27} cm^{−2}s^{−1}. The total integrated luminosity ( ∫ Ldt) during the LHCf operations in the three fills was 0.30 nb^{−1}. The uncertainty of the luminosity determination is ± 21 % [16]. The inelastic cross-section (σ_{inel}) for a √ s = 900 GeV proton-proton collision was estimated to be σ_{inel} = 53.0 mb from the predictions of the total cross-section and the elastic cross-section, which are based on the recent experimental results [17] [18]. The number of

Date Time (UT) Fill ID L (cm^{−2}s^{−1}) ∫ Ldt Crossing bunch 2 May 2012 12:50 – 19:23 1068 8 ∼ 3 × 10^{27} 0.11 nb^{−1} 1×1 3 May 2012 00:17 – 07:08 1069 12 ∼ 4 × 10^{27} 0.17 nb^{−1} 1×1 27 May 2012 13:18 – 14:03 1128 8 × 10^{27} 0.02 nb^{−1} 4×4

Table 1: Summary of the luminosity during √ s = 900 GeV operations [16].

inelastic collisions (N_{inel}) during the three fills was calculated to be 1.58×10^7. The luminosity during the three fills is summarized in Tab.1.

During the √ s = 900 GeV fills, the LHCf operations were performed with a high-gain operation of the PMTs for the sampling layers to detect photons with energies as low as 50 GeV with a nearly 100 % trigger efficiency and with a lower threshold with respect to the √ s = 7 TeV data. The typical PMT gain for the high-gain operations was 3 – 5 times higher than the nominal gain that was used to obtain the 7 TeV data. Neither the saturation of PMTs nor the range of ADC caused problems because the maximum energy of the incident photons were expected to be 8 times lower than those for the 7 TeV data. The data acquisition (DAQ) triggers were generated from beam pickup signals (BPTX) followed by “shower trigger” signals. The trigger condition of the shower trigger was that signals from any three successive scintillator layers in any calorimeters exceed the predefined threshold (approximately 17 MeV for high gain). The average DAQ live times during the LHCf √ s = 900 GeV operations was 99.2 % (Arm1) and 98.0 % (Arm2).

The total numbers of triggered events in Arm1 and Arm2 were 44,389 and 62,916, respectively. Because of the very low luminosity and the low event rate per inelastic collision, the probability of the pile-up of events was < 10^{−4}, negligibly small.

3. MC simulation

To compare the experimental results with the predictions of hadronic interaction models, MC simulations were performed with the hadronic interaction models, QGSJET II-03 [20], PYTHIA 8.145 [21] [22], SIBYLL 2.1 [23], EPOS 1.99 [24] and DPMJET 3.04 [25]. In the MC simulations, 3 × 10^7 inelastic proton-proton collisions were generated by each model, and the secondaries were transported in the beam pipe from IP1 to the LHCf detectors. The magnetic fields of the dipole magnets located between IP1 and the LHCf detectors were taken into account. The detector response was calculated using the EPICS 8.81/COSMOS 7.49 simulation package [19].

In addition, 1.0 × 10^8 events were generated using QGSJET II-03. This data set was used for studies of the detector response and particle identification (PID) correction described in Sec. 4.2.

4. Analysis

4.1. Energy Reconstruction

The sum of the energy deposited in the 2^{nd} to 13^{th} scintillator layers, after corrections for gain variation and the non-uniformity of the light yield of each scintillator layer, was used as an energy estimator for the primary photons incident on the LHCf detectors. Each PMT gain was premeasured for various HVs using N_2 laser calibration. The calibration of the deposited energy in each layer was performed for different HV settings (low-, nominal-, and highgain operations) using 50 – 200 GeV/c electron beams and 150 GeV/c muon beams at the CERN SPS [13]. The non-uniformity of the light yield of each scintillator layer was measured using a β-ray source before assembling the detectors. Because a fraction of the shower particles leak out of the sides of the calorimeters (‘shower leakage’), the total energy deposited was corrected for ‘shower leakage’ by a function of the shower impact position. This function was determined by the MC simulation. The impact positions of the showers were determined using the information from the position-sensitive layers. The events that fell within 2 mm of the edges of calorimeters were removed from the analysis to avoid the degradation of the energy resolution due to ‘shower leakage’. We set the energy threshold of this analysis to 50 GeV to avoid background from the interactions between secondary particles and the beam pipe, which was expected to be concentrated below 50 GeV according to a MC simulation. The trigger efficiencies of both Arms were also checked by two samples. One was an unbiased data sample with nominal gain triggered by the shower triggers at the opposite side of the detector. The other was the detector MC simulation for both high and nominal gains. Considering the difference of gains (a factor 3 – 5) between the high and nominal gain operations, the two methods gave consistent results. We found that the efficiencies were 100% for > 30 GeV incident photons for both arms for the higher gain. This was sufficiently lower than the 50 GeV analysis threshold.

Similar to the previous 7 TeV analysis, the systematic uncertainties of the absolute energy scale were evaluated from the reconstructed invariant mass

Energy range (GeV) 50 – 150 150 – 200 200 – 250 250 – 300 300 – 450 Arm1 Small (%) −2, +3 −6, +3 −26, +5 −48, +14 −48, +14 Arm1 Large (%) −8, +5 −20, +5 −20, +5 −50, +15 −71, +30

Table 2: Summary of the systematic errors for the energy spectra of Arm1 due to the energy scale uncertainty.

Energy range (GeV) 50 – 150 150 – 225 225 – 300 300 – 450 Arm2 Small (%) −15, +8 −15, +8 −28, +12 −66, +34 Arm2 Large (%) −5, +7 −20, +7 −24, +10 −63, +14

Table 3: Summary of the systematic errors for the energy spectra of Arm2 due to the energy scale uncertainty.

of the π^0s from the 7 TeV data taken with a nominal gain. Additionally, we checked π^0 mass peaks in the 7 TeV data with a higher gain taken in a different period. We found +2.7 % (+0.7 %) differences of the mass peaks from those for the nominal gain in Arm1 (Arm2). These differences were compatible with the uncorrelated energy scale errors (±3.5 %) quoted for the energy scale calibration of the detectors using the SPS beams or a longterm time variation. Conservatively, they were added to the energy scale’s systematic error in quadrature. Finally, the energy scale uncertainties were estimated to be [−10.2 %, +1.8 %] and [−6.6 %, +2.2 %] for Arm1 and Arm2, respectively. The systematic uncertainties of the energy spectra due to the energy scale uncertainty are listed for the Arm1 and the Arm2 detectors in Tab. 2 and Tab. 3, respectively.

The energy of photons in multi-hit events with more than one photons incident on a single tower would not be reconstructed correctly. We estimated the possible bias in the energy reconstruction due to double-incident events using MC simulation using QGSJET II-03. We found that the number of events whose true energies were modified by more than 2 % was very small. The fraction of such events was expected to be less than 1 % of the events having a total incident energy of >40 GeV. Although such multi-hit events can be identified using the lateral distributions measured by the positionsensitive layers, we did not apply the multi-hit cut or any correction to the spectra in this analysis to avoid a bias due to the misidentification of single photon events as multi-hit events. The effect was at most 1% in the lower energy bins.

4.2. Photon Event Selection

To select the electromagnetic shower events and to eliminate contamination by hadronic shower events, a parameter called L_{90%} was defined. L_{90%} is a longitudinal length in units of radiation length (r.l.) in which 90 % of the total shower energy is deposited in the calorimeter. Figure 2 shows the L_{90%} distribution of the Arm1 small tower events with reconstructed energy in the range of 50 to 100 GeV. The two peaks near 13 r.l. and 35 r.l. correspond to electromagnetic showers and hadronic showers, respectively. Fig. 2 also shows the L_{90%} distributions generated by the MC simulation with QGSJET II-03 for pure photons and pure hadrons (neutrons). These MC distributions have been normalized to the L_{90%} distribution of the experimental data. They are hereafter called the ‘template’. We set the L_{90%} criteria to keep the photon selection efficiency ϵ_{P ID} = 90% over the entire energy range based on the template for photons. In Fig. 2 this would correspond to L_{90%} = 16.8 r.l.

The purity (P) of a photon sample was estimated by normalizing the templates for photons and for hadrons to the measured L_{90%} distribution for each energy range (‘template fitting’ of the L_{90%} distribution). P was defined as P = N_{photon}/(N_{photon} + N_{hadron}) in each energy region. Here N_{photon} and N_{hadron} are the numbers of photons and hadrons in the selected L_{90%} range in the template, respectively. The correction factor P × ϵ^{−1}_{P ID} was applied to the number of events in each energy bin to correct for the inefficiency of the photon selection and for the residual contamination by hadrons.

However, there were small discrepancies between the L_{90%} distributions of the experimental data and of the MC simulations. These discrepancies may be caused by errors in the absolute energy determination or in the channelto-channel gain calibrations. Here, we consider the systematic uncertainty caused by the uncertainty of the ‘template fitting’ method for obtaining photon spectra. Small modifications of the template (widening with respect to the peak position up to 30 % and a constant shift up to 1.0 r.l. for Arm1 and 0.8 r.l. for Arm2, to give the best match with the data) provide the size of uncertainty in the correction factors to the photon spectra. The difference of the correction factors between the original and the modified template methods amounted to ±10 % (±12 %) and ±55 % (±44 %) for below and above 150 GeV photon energy, respectively, in the Arm1 small (large) tower. The difference of the correction factors were ±20 % (±25 %) in the Arm2 small

(large) tower for entire photon energy. These numbers were assigned as the systematic uncertainty of the energy spectra due to PID errors.

4.3. Background Subtraction

The background particles from the interactions between the proton beams and the residual gas in the vacuum beam pipe hit the detectors synchronously with the beam-beam events. The amount of this background can be estimated using the events triggered by the passage of non-crossing bunches. Assuming that the beam intensity of each bunch was same, the background levels were estimated as approximately 1 % and 2 % for the small and large towers, respectively, in both Arms. The estimated backgrounds were subtracted from the energy spectra.

4.4. Beam Center Position

The projected position of the zero-degree collision angle at the LHCf detectors, referred as the ‘beam center’, is an important parameter in the geometrical analysis of the experimental data. Because the flux of the secondary particles produced by √ s = 900 GeV proton-proton collisions was expected to be uniform over the acceptance of the LHCf detectors, the beam center could not be determined directly from our measurements. In this analysis, we assumed that the beam center was at the center position determined by the alignment survey of the detectors. The beam center was located near the center of the small calorimeter of each Arm as shown in Fig. 1. The beam position and the beam angle were monitored by the Beam Position Monitor (BPMSW) installed ± 21 m from IP1 [26]. The fill-by-fill fluctuation of the calculated ‘beam center’ at the LHCf detectors during the period for the presented data set was approximately 4 mm. We assigned a systematic uncertainty of ±2 mm to the beam center. To estimate the effect of this uncertainty on the energy spectra, we defined an area that had a slightly narrower acceptance than the calorimeter, and an energy spectrum was generated from the events falling within this area. Additionally, four spectra were made by shifting the area by ±2 mm vertically and horizontally. As a systematic uncertainty of energy spectra due to the uncertainty of the beam center, we assigned the differences of the spectra as shown in Tab. 4 and Tab. 5 for the Arm1 and the Arm2 detectors, respectively.

Energy range (GeV) 50 – 150 150 – 250 250 – 450 Arm1 Small (%) −7, +2 −7, +2 −17, +2 Arm1 Large (%) −11, +6 −11, +12 −15, +12

Table 4: Summary of the systematic errors for the energy spectra of Arm1 due to the beam center uncertainty.

Energy range (GeV) 50 – 175 175 – 250 250 – 450 Arm2 Small (%) −3, +3 −4, +9 −4, +13 Arm2 Large (%) −3, +4 −3, +6 −16, +14

Table 5: Summary of the systematic errors for the energy spectra of Arm2 due to the beam center uncertainty.

5. Energy Spectra Results

5.1. Reconstruction of Energy Spectra

To reduce a possible pseudorapidity (η) dependence when comparing and combining the energy spectra measured by the two Arms, we selected Arm2 events with a pseudorapidity range similar to that of Arm1. For the small tower, we selected events with the distance (r) from the beam center less than 11 mm, which corresponded to the pseudorapidity range of η > 10.15 (the circles in Fig. 1). Similarly, for the large tower, we set the conditions as 22 mm < r < 44 mm, which corresponded to the pseudorapidity range of 8.77 < η < 9.46 (the arcs in Fig. 1). The calorimeters did not uniformly cover the pseudorapidity ranges as shown in Fig. 1. We confirmed that there was a negligible pseudorapidity dependence of the energy spectra inside each pseudorapidity range. The reconstructed photon energy spectra of Arm1 and Arm2 are shown in Fig. 3 in units of differential cross-sections dσ/dEdΩ, where E is the photon energy and Ω is the solid angle. The differential crosssection was calculated as dσ/dEdΩ = 1/( ∫ Ldt) dN/dEd(cosθ)dϕ, where N is the number of events in each energy bin, ∫ Ldt is the integrated luminosity after the correction for the DAQ live time for each Arm and θ and ϕ are the polar and the azimuthal angles with respect to the beam axis, respectively. Considering the geometrical acceptance of the calorimeters, the averages of the polar angle ⟨θ⟩ are 39 μrad and 234 μrad for the small and the large tower, respectively. The error bars in Fig. 3 indicate the statistical uncertainty; the hatched areas show the systematic errors in which the particle identification and the beam position uncertainties were taken into account. Because the systematic uncertainties due to the energy determination may be correlated between Arm1 and Arm2 [8], they were not taken into account in Fig. 3. The two spectra from Arm1 and Arm2 in each pseudorapidity region gave consistent results within the statistical and the systematic errors.

The combined energy spectra of Arm1 and Arm2 are shown in Fig. 4 as weighted averages, with the weights taken to be the square of the inverse of the errors in each energy bin. The error bars of the data (black points) represent the statistical error; the hatches in the spectra represent the total uncertainty (quadratical summation of the statistical and the systematic errors). The sources of the systematic error are the particle identification and the beam position uncertainties. The energy scale errors were also included, assuming a correlation between the two Arms. Note that the uncertainty of the luminosity determination (±21 %) is not shown in Fig. 4. It can introduce a constant vertical shift of the spectra, but it cannot change the shapes of the spectra. We see a smooth spectrum from each of the two pseudorapidity regions, considering the errors. The similarity of the two spectra suggests only a small pseudorapidity dependence between the two pseudorapidity regions.

5.2. Comparison with Models

In Fig. 4, the predictions of the hadronic interaction models, QGSJET I I-03, PYTHIA 8.145, SIBYLL 2.1, EPOS 1.99 and DPMJET 3.04, are also shown. The same analysis processes were applied to the MC simulations as to the experimental data except for the particle identification using L_{90%} and its correction. For the analysis of the MC simulations, the known particle type was used. For better visibility, only the statistical errors for DPMJET 3.04 (red points) are shown by the error bars. Figure 5 shows the ratios of the MC spectra divided by the data in each energy bin. In Fig. 5, the statistical error of each MC is shown as the error bar of each point. The trends of the experimental data compared to each MC are similar for the two pseudorapidity ranges. EPOS 1.99 and SYBILL 2.1 show a reasonable agreement with the spectral shape of the experimental data, whereas they predict lower cross-sections than the data. The other models, DPMJET 3.04, QGSJET I I-03 and PYTHIA 8.145, are in good agreement with the data below 300 GeV but predict harder energy spectra than the data above 300 GeV. The trends of the experimental data compared to the MC predictions in Fig. 5 are similar to those for the single-photon energy spectra in the pseudorapidity η > 10.94 previously reported for √ s = 7TeV proton-proton collisions [8].

6. Summary

LHCf measured the forward inclusive photon energy spectra for √ s = 900 GeV proton-proton collisions in May 2010. The total integrated luminosity of the data set used in this analysis is 0.30 nb^{−1}. The two LHCf detectors (Arm1 and Arm2) gave consistent results within the statistical and systematic errors for the small and the large towers, which cover the pseudorapidity ranges of η > 10.15 and 8.77 < η < 9.46, respectively. The combined energy spectra of Arm1 and Arm2 were compared with the predictions of five hadronic interaction models, DPMJET 3.04, EPOS 1.99, PYTHIA 8.145, QGSJET II-03 and SIBYLL 2.1. EPOS 1.99 and SIBYLL 2.1 reproduce well the shape of the experimental energy spectra, but they predict a lower cross-section than the LHCf data. The other models predict harder spectra than the LHCf data above 300 GeV. These results of comparison exhibited features similar to those for the previously reported data for √ s = 7 TeV collisions.

Acknowledgements

We thank the CERN staff and the ATLAS collaboration for their essential contributions to the successful operation of LHCf. This work is partly supported by Grant-in-Aid for Scientific Research by MEXT of Japan, the Mitsubishi Foundation in Japan and INFN in Italy. The receipts of JSPS Research Fellowship (HM and TM), INFN fellowship for non-Italian citizens (HM and KN) and the GCOE Program of Nagoya University ‘QFPU’ from JSPS and MEXT of Japan (GM) are also acknowledged. A part of this work was performed using the computer resource provided by the Institute for the Cosmic-Ray Research (ICRR), University of Tokyo.

References

[1] J. Abraham, et al., Phys. Rev. Lett., 101 061101 (2008)

[2] P. Abreu, et al., Astropart. Phys., 34, 314-326 (2010)

[3] J. Abraham, et al., Phys. Rev. Lett., 104, 091101 (2010)

[4] R. Abbasi, et al., Astropart. Phys., 32, 53-60 (2009) [5] R. U. Abbasi, et al., The Astrophysical Journal Letters, 713, 64-68 (2010) [6] R. U. Abbasi, et al., Phys. Rev. Lett. 104, 161101 (2010) [7] H. Sagawa, AIPC, 1367, 17-22, (2011) [8] O. Adriani, et al., Phys. Lett. B, 703 128-137 (2011) [9] E. Paré, et al., Phys. Lett. B, 242, 531-535 (1990) [10] LHCf Technical Design Report, CERN-LHCC-2006-004 [11] O. Adriani, et al., JINST, 3, S08006 (2008) [12] T. Sako, et al., NIM, A578, 146 (2007) [13] T. Mase, et al., NIM, A671, 129-136(2012) [14] O. Adriani, et al., JINST, 5, P01012 [15] H. Menjo et al., Astropart. Phys., 34, 513-520 (2011) [16] The ATLAS collaboration, ATLAS-CONF-2010-060 [17] G.Antchev et al., EPL, 96 21002 (2011) [18] K. Nakamura, et al., J. Phys. G, 37 075021 (2010) [19] K. Kasahara, EPICS web page, http://cosmos.n.kanagawa-u.ac.jp/ [20] S. Ostapchenko, Phys. Rev., D74, 014026 (2006) [21] T. Sjöstand, S. Mrenna and P. Skands, JHEP05, 026 (2006) [22] T. Sjöstand, S. Mrenna and P. Skands, Comput. Phys. Comm., 178, 852 (2008) [23] E.-J. Ahn, R. Engel, T. K. Gaisser, P.Lipari and T. Stanev, Phys. Rev., D80, 094003 (2009) [24] K. Werner, F.-M. Liu and T. Pierog, Phys. Rev., C74, 044902 (2006)

[25] F. W. Bopp, J. Ranft R. Engel and S. Roesler, Phys. Rev., C77, 014904 (2008) [26] G. Vismara, CERN-SL-2000-056 BI (2000)

Figure 1: The cross-sections of the calorimeters viewed from IP1, left for Arm1 and right for Arm2. The cross marks on the small calorimeters indicate the projections of the zero-degree collision angle onto the detectors (‘beam center’). The shaded areas in the upper parts of the figure indicate the shadows of the beam pipes located between IP1 and the detectors, where the detectors are insensitive to the detection of IP1 proton-proton collision products. The dashed squares indicate the border of a 2 mm edge cut described in Sec. 4.1. The circles and the arcs indicate the distance (r) from the beam center of 11 mm, 22 mm and 44 mm, and the pseudorapidity (η) of 10.15, 9.46 and 8.77, respectively. In this analysis, the events in the regions of r < 11 mm and 22 mm < r < 44 mm were used.

Figure 2: The L_{90%} distribution measured by the Arm1 small tower for the reconstructed energy range of 50 – 100 GeV. The black points show the experimental data; the red and blue histograms are the L_{90%} distributions of MC calculation for pure photons and pure hadrons (‘templates’), respectively. These template histograms are independently normalized to give the best match to the experimental result.

Figure 3: Photon energy spectra measured by Arm1 (red circles) and Arm2 (blue rectangles) in units of differential cross-section dσ/dEdΩ. The left and the right panels show the results of the small towers and the large towers, respectively. The pseudorapidity coverages of the small and the large towers are η > 10.15 and 8.77 < η < 9.46, respectively. Considering the geometrical shape of the calorimeters, the averages of the polar angle ⟨θ⟩ with respect to the beam axis are 39 μrad and 234 μrad for the small and the large towers, respectively. The error bars indicate the statistical errors, and the hatched areas indicate the total systematic uncertainties that come from particle identification and the ‘beam center’ position.

Figure 4: Combined Arm1 and Arm2 photon energy spectra compared with MC predictions. The data from Arm1 and Arm2 correspond to the integral luminosities of 0.30 and 0.29 nb^{−1}, respectively. The left and the right panels are the results of the small (η > 10.15) and the large (8.77 < η < 9.46) towers, respectively. The black points indicate the experimental data with the statistical uncertainty (error bars) and the total uncertainty, quadratical summation of the statistical and the systematic errors (black hatches). The systematic uncertainty of the luminosity determination (±21 %) is not taken into account in the errors. The colored points indicate the results of MC predictions, QGSJET II-03 (blue), PYTHIA 8.145 (yellow), SIBYLL 2.1 (green), EPOS 1.99 (magenta) and DPMJET 3.04 (red). Only the statistical uncertainty of DPMJET 3.04 is shown by the error bars as representative of the models.

Figure 5: Ratio of the MC spectra divided by the data in each energy bin. The left and the right panels show the spectra for the pseudorapidity ranges of η > 10.15 and 8.77 < η < 9.46, respectively. The colored plots indicate the results of MC, QGSJET II-03 (blue), PYTHIA 8.145 (yellow), SIBYLL 2.1 (green), EPOS 1.99 (magenta) and DPMJET 3.04 (red). To describe the size of the errors, the experimental data are also shown on the ratio of unity with the statistical uncertainty (error bars) and the total uncertainty of data (the black hatches). The luminosity uncertainty was not included. The statistical uncertainties of each MC are shown as the error bars of MC.