arXiv:cond-mat/0507050v1 [cond-mat.dis-nn] 2 Jul 2005

APS/123-QED

Localization of Bose-Einstein Condensation and Disappearance of Superfluidity of Strongly Correlated Bose Fluid in a Confined Potential

Michikazu Kobayashi and Makoto Tsubota Faculty of Science, Osaka City University, Sugimoto3-3-138, Sumiyoshi-ku, Osaka558-8585, Japan (Dated: October 1, 2020)

We develop a Bose fluid model in a confined potential to consider the new quantum phase due to the localization of Bose-Einstein condensation and disappearance of superfluidity which is recently observed in liquid^4He in porous glass at high pressures. A critical pressure of the transition to this phase can be defined by our new analytical criterion of supposing the size of localized Bose-Einstein condensate becomes comparable to the scale of confinement. The critical pressure is quantitatively consistent with observations without free parameters.

PACS numbers: 01.30.Cc, 67.40.-w, 64.60.Cn

I. INTRODUCTION

A Bose condensed system in a random environment is a very important problem not only on the interests in the impurity effect but also for clarifying the long-range correlation, for example, the relation between Bose-Einstein condensation (BEC) and superfluidity. Experimental works have studied this system by means of liquid^4He in porous glass and observed many interesting phenomena [1, 2, 3]. In particular, Yamamoto et al. recently observed the disappearance of superfluidity of liquid^4He confined in porous Geltech silica with the very small pore size 25Å at high pressures and very low temperatures, suggesting the new quantum phase transition to localized BEC under the effect of strong correlation [3].

In this work, motivated by their experiment, we investigate the behavior of a Bose fluid under the effect of confinement at zero temperature. We use the threedimensional Bose fluid model in a confined potential [4], and introduce our new criterion for finding the localization of BEC. Supposing a BEC is localized, we calculate the energy of the system as a function of the size of the localized BEC, and minimize the energy. The resulting size becomes the order of the scale of confinement above a critical pressure, when the superfluid density disappears. The critical pressure is quantitatively consistent with the experimental one without free parameters.

II. THE MODEL OF BOSE FLUID IN A CONFINED POTENTIAL

The Grand canonical Hamiltonian Ĥ − μN̂ of a Bose fluid in a confined potential is given by

Ĥ − μN̂ = ∑ k [ε(k) − μ]â^†(k)â(k) + 1 V ∑ k_1 ,k_2

U(k_1 − k_2)â^†(k_1)â(k_2) + 1 2V ∑ k_1,k_2,q

g_0(q)â^†(k_1 + q)â^†(k_2 − q)â(k_2)â(k_1), (1)

where â^†(k) and â(k) are the free Boson creation and annihilation operators with the wave number k, ε(k) = ℏ^2k^2/2m is the kinetic energy of a particle of mass m, μ the chemical potential. U(k) is the external confined potential, V = L^3 the volume of the system having the size L and g_0(k) the interaction between two particles. The second term of the right-hand side represents the interaction between one particle and the confined potential; the second-order perturbation yields the Green function

G^R(k) = 1 ℏ^2V^2 ∑ k_1

|U(k − k_1)|^2G^0(ω, k)^2G^0(ω, k_1). (2)

The third term refers to the interparticle interaction. Using the ring-approximation, we obtain g(q) = g_0(q) 1 + g_0(q) ℏV ∑ ∫ k dk_0 2πi G^0(q)G^0(k + q)

. (3)

Here G^0(k) is the noninteracting Green function

G^0(k) = G^0(ω, k) = ℏ ℏω − [ε(k) − μ] , (4)

with the frequency ω and k = (ω, k). Following the Bogoliubov method, we separate â(k) to the condensed part a(k_c) = √ N_c with the smallest wave number k_c = (2π/L, 2π/L, 2π/L), and the noncondensed part â(k ≠ k_c). Then we calculate the Green function G^I(k)

2 including interparticle interaction g(k) by the Bogoliubov theory, finally obtaining the total Green function G(k) = G^R(k) + G^I(k). Superfluid component N_s based on the two fluid model can be given by the linear response theory [5]

N_s = N − ℏ 6πmi ∑ ∫ k dk_0 k^2 det[G(k)], (5)

where N is the total number of the particles. We assume the gaussian confinement U(k) = U_0 exp[−k^2/2k^2_p] so that the wave number k_p = 2π/r_p can be connected with the pore size r_p of porous glass. Here the strength U_0 is estimated from the experimental critical coverage below which superfluidity vanishes [4]. For the interparticle interaction, we use g_0(k) = v_0(σ √ 2π)^3 exp[−k^2σ^2/2], where parameters v_0 and σ are determined by the comparison with the potential proposed by Aziz et al. [6].

To consider the phase of localized BEC, we introduce a new criterion. First we assume a localized BEC of the size L_g and calculate the energy E_g by replacing the volume V in Eq. (1) with V_g = L^3_g. The total energy of the volume V should be proportional to E_gV/V_g, because the number of the localized BECs is proportional to V/V_g. The ideal or weakly interacting Bose gas has E_g proportional to V_g. In the strongly correlated Bose fluid, however, E_g is no longer a simple linear function of V_g, then E_g/V_g depends on V_g. Calculating E_g/V_g as a function of V_g, we find V_g = V_{g,min} which minimizes E_g/V_g. The localization of BEC can be defined by the new criterion. If V_{g,min} exceeds V , the system is a non-localized BEC state. When V_{g,min} is reduced to become comparable to r^3_p, we judge that the BEC is localized. Since V_{g,min} is a function of N and the pressure P , we can obtain the phase boundary of the transition to localization of BEC by this criterion.

Figure 1 shows the dependence of N_s and V_{g,min} on the pressure, where all numerical parameters are fixed from Reference [3, 6] and remain no free parameters. At the pressure P ≃ 4.2 MPa, superfluid component N_s disappears and V_{g,min} is reduced dramatically to the order of r^3_p. We can, therefore, define this pressure as the critical pressure P_c. Our critical pressure P_c ≃ 4.2 MPa is quantitatively consistent with the experimental one P_c ≃ 3.5 MPa [3] and we also conclude that experimental disappearance of superfluidity at high pressures is caused by the transition to localization of BEC. For the case of porous glass of the larger pore size r_p ≃ 70 Å, we obtain the much larger critical pressure P_c ≃ 9 MPa which is too high for a BEC to be localized against solidification of liquid^4He, which is also consistent with experimental result for Vycor glass [3].

Acknowledgments

MT and MK both acknowledge support by Grant-in- Aid for Scientific Research (Grant No. 15340122 and

FIG. 1: Dependence of the superfluid component Ns and the volume Vg,min of the localized BEC on the pressure. The pressure P can be obtained by the thermodynamic relation P = −∂E/∂V .

1505983 respectively) by the Japan Society for the Promotion of Science.

[1] J. D. Reppy, J. Low. Temp. Phys. 87, 205–245 (1992). [2] O. Plantevin, H. R. Glyde, B. Fåk, J. Bossy, F. Albergamo, N. Mulders and H. Schober, Phys. Rev. B, 65, 224505 (2002).

[3] K. Yamamoto, H. Nakashima, Y. Shibayama and K. Shirahama, Phys. Rev. Lett. 93, 075302 (2004).

[4] M. Kobayashi and M. Tsubota, Phys. Rev. B, 66, 174516

(2002).

[5] P. C. Hohenberg and P. C. Martin, Ann. Phys. 34, 291– 359 (1965).

[6] R. A. Aziz, A. R. Janzen and M. R. Moldover, Phys. Rev.

Lett. 74, 1586–1589 (1995).